<img width="1024" height="896" src="https://genesisproject.ph/wp-content/uploads/2025/04/Add-a-little-bit-of-body-text-19-1024x896.png" alt="" srcset="https://genesisproject.ph/wp-content/uploads/2025/04/Add-a-little-bit-of-body-text-19-1024x896.png 1024w, https://genesisproject.ph/wp-content/uploads/2025/04/Add-a-little-bit-of-body-text-19-300x263.png 300w, https://genesisproject.ph/wp-content/uploads/2025/04/Add-a-little-bit-of-body-text-19-768x672.png 768w, https://genesisproject.ph/wp-content/uploads/2025/04/Add-a-little-bit-of-body-text-19.png 1200w" sizes="(max-width: 1024px) 100vw, 1024px" />															
					<!-- wp:html -->
<p>&nbsp;</p>
<p>&nbsp;</p>
<p>&nbsp;</p>
<p><style>
    body {
      margin: 0;
      padding: 0;
      background: #f3f3f3;
      font-family: Arial, sans-serif;
      display: flex;
      align-items: center;
      justify-content: center;
      height: 100vh;
    }
    .construction-banner {
      position: relative;
      background: repeating-linear-gradient(
        45deg,
        black,
        black 10px,
        yellow 10px,
        yellow 20px
      );
      width: 100%;
      max-width: 600px;
      height: 150px;
      display: flex;
      align-items: center;
      justify-content: center;
      overflow: hidden;
      border-radius: 8px;
    }
    .construction-banner::before,
    .construction-banner::after {
      content: "";
      position: absolute;
      width: 100%;
      height: 15px;
      background: inherit;
    }
    .construction-banner::before {
      top: 25px;
    }
    .construction-banner::after {
      bottom: 25px;
    }
    .construction-text {
      position: relative;
      background: yellow;
      padding: 20px 40px;
      border-radius: 8px;
      font-weight: bold;
      font-size: 1.2rem;
      color: black;
      border: 3px solid black;
      text-transform: uppercase;
    }
  </style></p>
Under Construction
<!-- /wp:html -->